From 65b4458474407dcd40b0c5bdb731ba2f88989e89 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Mon, 7 Apr 2025 19:31:15 +0900
Subject: fix(frontend): fix drawer menu style

---
 packages/frontend/src/components/MkMenu.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkMenu.vue')

diff --git a/packages/frontend/src/components/MkMenu.vue b/packages/frontend/src/components/MkMenu.vue
index f2f36308ca..44f5a09404 100644
--- a/packages/frontend/src/components/MkMenu.vue
+++ b/packages/frontend/src/components/MkMenu.vue
@@ -473,7 +473,7 @@ onBeforeUnmount(() => {
 		}
 	}
 
-	&:not(.widthSpecified) {
+	&:not(.asDrawer):not(.widthSpecified) {
 		> .menu {
 			max-width: 400px;
 		}
-- 
cgit v1.2.3-freya

