From e1cd7c94fb13f8e49667b17554d22ce8de627a2a Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Sat, 10 May 2025 07:58:26 +0900
Subject: refactor(frontend): use* 関数の格納場所のフォルダ名を composables
 に変更 (#16004)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

* refactor(frontend): use* 関数の格納場所を正式名称（composables）に変更

* migrate

* move useLoading
---
 packages/frontend/src/components/MkInstanceStats.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkInstanceStats.vue')

diff --git a/packages/frontend/src/components/MkInstanceStats.vue b/packages/frontend/src/components/MkInstanceStats.vue
index 90391005bc..07d88d6575 100644
--- a/packages/frontend/src/components/MkInstanceStats.vue
+++ b/packages/frontend/src/components/MkInstanceStats.vue
@@ -89,7 +89,7 @@ import { Chart } from 'chart.js';
 import type { HeatmapSource } from '@/components/MkHeatmap.vue';
 import MkSelect from '@/components/MkSelect.vue';
 import MkChart from '@/components/MkChart.vue';
-import { useChartTooltip } from '@/use/use-chart-tooltip.js';
+import { useChartTooltip } from '@/composables/use-chart-tooltip.js';
 import { $i } from '@/i.js';
 import * as os from '@/os.js';
 import { misskeyApiGet } from '@/utility/misskey-api.js';
-- 
cgit v1.2.3-freya

