From b668d161a9a0a2f73c487f3fa6d54fd7597635a5 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Thu, 10 Oct 2024 16:12:16 +0900
Subject: refactor(frontend): prefix css variables (UI) (#14739)

* refactor(frontend): prefix css variables

* `MI_UI` -> `MI`

* fix

* `stickyBottom`

* stickyTop
---
 packages/frontend/src/components/MkInstanceStats.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkInstanceStats.vue')

diff --git a/packages/frontend/src/components/MkInstanceStats.vue b/packages/frontend/src/components/MkInstanceStats.vue
index da313d4d70..8ccbf61e48 100644
--- a/packages/frontend/src/components/MkInstanceStats.vue
+++ b/packages/frontend/src/components/MkInstanceStats.vue
@@ -257,7 +257,7 @@ onMounted(() => {
 				min-width: 0;
 				position: relative;
 				background: var(--MI_THEME-panel);
-				border-radius: var(--radius);
+				border-radius: var(--MI-radius);
 				padding: 24px;
 				max-height: 300px;
 
-- 
cgit v1.2.3-freya

