From ada04c1932dd694af1775e562fdcfa2c506454de Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Tue, 27 Dec 2022 18:01:06 +0900
Subject: perf?(client): remove needless scoped annotation for style

---
 packages/frontend/src/components/MkImageViewer.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkImageViewer.vue')

diff --git a/packages/frontend/src/components/MkImageViewer.vue b/packages/frontend/src/components/MkImageViewer.vue
index f074b1a2f2..77c7a93518 100644
--- a/packages/frontend/src/components/MkImageViewer.vue
+++ b/packages/frontend/src/components/MkImageViewer.vue
@@ -31,7 +31,7 @@ const emit = defineEmits<{
 const modal = $ref<InstanceType<typeof MkModal>>();
 </script>
 
-<style lang="scss" scoped>
+<style lang="scss">
 .xubzgfga {
 	display: flex;
 	flex-direction: column;
-- 
cgit v1.2.3-freya

