From b668d161a9a0a2f73c487f3fa6d54fd7597635a5 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Thu, 10 Oct 2024 16:12:16 +0900
Subject: refactor(frontend): prefix css variables (UI) (#14739)

* refactor(frontend): prefix css variables

* `MI_UI` -> `MI`

* fix

* `stickyBottom`

* stickyTop
---
 packages/frontend/src/components/MkFolder.vue | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'packages/frontend/src/components/MkFolder.vue')

diff --git a/packages/frontend/src/components/MkFolder.vue b/packages/frontend/src/components/MkFolder.vue
index 290d73dd92..5f9500d923 100644
--- a/packages/frontend/src/components/MkFolder.vue
+++ b/packages/frontend/src/components/MkFolder.vue
@@ -145,8 +145,8 @@ onMounted(() => {
 	box-sizing: border-box;
 	padding: 9px 12px 9px 12px;
 	background: var(--MI_THEME-folderHeaderBg);
-	-webkit-backdrop-filter: var(--blur, blur(15px));
-	backdrop-filter: var(--blur, blur(15px));
+	-webkit-backdrop-filter: var(--MI-blur, blur(15px));
+	backdrop-filter: var(--MI-blur, blur(15px));
 	border-radius: 6px;
 	transition: border-radius 0.3s;
 
@@ -236,12 +236,12 @@ onMounted(() => {
 .footer {
 	position: sticky !important;
 	z-index: 1;
-	bottom: var(--stickyBottom, 0px);
+	bottom: var(--MI-stickyBottom, 0px);
 	left: 0;
 	padding: 12px;
 	background: var(--MI_THEME-acrylicBg);
-	-webkit-backdrop-filter: var(--blur, blur(15px));
-	backdrop-filter: var(--blur, blur(15px));
+	-webkit-backdrop-filter: var(--MI-blur, blur(15px));
+	backdrop-filter: var(--MI-blur, blur(15px));
 	background-size: auto auto;
 	background-image: repeating-linear-gradient(135deg, transparent, transparent 5px, var(--MI_THEME-panel) 5px, var(--MI_THEME-panel) 10px);
 	border-radius: 0 0 6px 6px;
-- 
cgit v1.2.3-freya

