From be7e3b9a0cb81b78a744993fef2fa2fd2833fa9c Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 9 Mar 2025 14:28:01 +0900
Subject: refactor(frontend): scripts -> utility

---
 packages/frontend/src/components/MkDigitalClock.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkDigitalClock.vue')

diff --git a/packages/frontend/src/components/MkDigitalClock.vue b/packages/frontend/src/components/MkDigitalClock.vue
index 2e2321e6ac..8198356a76 100644
--- a/packages/frontend/src/components/MkDigitalClock.vue
+++ b/packages/frontend/src/components/MkDigitalClock.vue
@@ -17,7 +17,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 <script lang="ts" setup>
 import { onMounted, onUnmounted, ref, watch } from 'vue';
-import { defaultIdlingRenderScheduler } from '@/scripts/idle-render.js';
+import { defaultIdlingRenderScheduler } from '@/utility/idle-render.js';
 
 const props = withDefaults(defineProps<{
 	showS?: boolean;
-- 
cgit v1.2.3-freya

