From ada04c1932dd694af1775e562fdcfa2c506454de Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Tue, 27 Dec 2022 18:01:06 +0900
Subject: perf?(client): remove needless scoped annotation for style

---
 packages/frontend/src/components/MkDigitalClock.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkDigitalClock.vue')

diff --git a/packages/frontend/src/components/MkDigitalClock.vue b/packages/frontend/src/components/MkDigitalClock.vue
index 9ed8d63d19..c2a17f2a03 100644
--- a/packages/frontend/src/components/MkDigitalClock.vue
+++ b/packages/frontend/src/components/MkDigitalClock.vue
@@ -62,7 +62,7 @@ onUnmounted(() => {
 });
 </script>
 
-<style lang="scss" scoped>
+<style lang="scss">
 .zjobosdg {
 	> .colon {
 		opacity: 0;
-- 
cgit v1.2.3-freya

