From 1b3a8cd97da33753ee4f6f6b6eaf067cfa4aa325 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Fri, 9 May 2025 20:41:50 +0900
Subject: fix(frontend):
 "時計"ウィジェット(Clock)において、Transparent設定が有効でも、その背景が透過されない
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Fix #15994
---
 packages/frontend/src/components/MkContainer.vue | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'packages/frontend/src/components/MkContainer.vue')

diff --git a/packages/frontend/src/components/MkContainer.vue b/packages/frontend/src/components/MkContainer.vue
index 1993991106..6bf55388af 100644
--- a/packages/frontend/src/components/MkContainer.vue
+++ b/packages/frontend/src/components/MkContainer.vue
@@ -154,6 +154,10 @@ onUnmounted(() => {
 	&.naked {
 		background: transparent !important;
 		box-shadow: none !important;
+
+		> .content {
+			background: transparent !important;
+		}
 	}
 
 	&.scrollable {
-- 
cgit v1.2.3-freya

