From 13677ff2b0b14d715a65f2922d06f88efb4ba253 Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Wed, 28 Dec 2022 09:32:22 +0900
Subject: remove v-size directive

---
 packages/frontend/src/components/MkContainer.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkContainer.vue')

diff --git a/packages/frontend/src/components/MkContainer.vue b/packages/frontend/src/components/MkContainer.vue
index 6d4d5be2bc..5ac95fba07 100644
--- a/packages/frontend/src/components/MkContainer.vue
+++ b/packages/frontend/src/components/MkContainer.vue
@@ -1,5 +1,5 @@
 <template>
-<div v-size="{ max: [380] }" class="ukygtjoj _panel" :class="{ naked, thin, hideHeader: !showHeader, scrollable, closed: !showBody }">
+<div class="ukygtjoj _panel" :class="{ naked, thin, hideHeader: !showHeader, scrollable, closed: !showBody }">
 	<header v-if="showHeader" ref="header">
 		<div class="title"><slot name="header"></slot></div>
 		<div class="sub">
@@ -233,7 +233,7 @@ export default defineComponent({
 		}
 	}
 
-	&.max-width_380px, &.thin {
+	&.thin {
 		> header {
 			> .title {
 				padding: 8px 10px;
-- 
cgit v1.2.3-freya

