From 63df2c851e31a30dda3b7e9edefb2a97e4c1daa6 Mon Sep 17 00:00:00 2001
From: Kagami Sascha Rosylight <saschanaz@outlook.com>
Date: Thu, 16 Feb 2023 15:09:41 +0100
Subject: refactor: remove all unused imports (#9951)

Co-authored-by: tamaina <tamaina@hotmail.co.jp>
---
 packages/frontend/src/components/MkChart.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkChart.vue')

diff --git a/packages/frontend/src/components/MkChart.vue b/packages/frontend/src/components/MkChart.vue
index 57efda44b1..06d5b9949a 100644
--- a/packages/frontend/src/components/MkChart.vue
+++ b/packages/frontend/src/components/MkChart.vue
@@ -14,7 +14,7 @@
   id-denylist violation when setting it. This is causing about 60+ lint issues.
   As this is part of Chart.js's API it makes sense to disable the check here.
 */
-import { onMounted, ref, shallowRef, watch, PropType, onUnmounted } from 'vue';
+import { onMounted, ref, shallowRef, watch, PropType } from 'vue';
 import { Chart } from 'chart.js';
 import gradient from 'chartjs-plugin-gradient';
 import * as os from '@/os';
-- 
cgit v1.2.3-freya

