From f83bd31fd5fee0bb2209ad0e5359ffa473ffb30e Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Mon, 19 Dec 2022 13:53:41 +0900
Subject: wip

---
 packages/client/src/components/MkModalWindow.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/client/src/components/MkModalWindow.vue')

diff --git a/packages/client/src/components/MkModalWindow.vue b/packages/client/src/components/MkModalWindow.vue
index 5acd8c921f..139c6b5e50 100644
--- a/packages/client/src/components/MkModalWindow.vue
+++ b/packages/client/src/components/MkModalWindow.vue
@@ -7,7 +7,7 @@
 				<slot name="header"></slot>
 			</span>
 			<button v-if="!withOkButton" class="_button" @click="$emit('close')"><i class="fas fa-times"></i></button>
-			<button v-if="withOkButton" class="_button" :disabled="okButtonDisabled" @click="$emit('ok')"><i class="fas fa-check"></i></button>
+			<button v-if="withOkButton" class="_button" :disabled="okButtonDisabled" @click="$emit('ok')"><i class="ti ti-check"></i></button>
 		</div>
 		<div class="body">
 			<slot :width="bodyWidth" :height="bodyHeight"></slot>
-- 
cgit v1.2.3-freya

